SPIDER

Steve Fisher / RAL

SPIDER

At the last meeting I was not too optimistic about

SPIDER.

The current status is that because of disarray in the

LCB meeting, work is suspended while Delfino looks into it.

Main problem appears to be the idea of the Common

Project.

Experiments not all behind them

Might do better working with one willing experiment

Have to wait for Manuel

Something seems sure to be changed

CodeCheck: Do we wait?

No action is required

Spider CodeCheck product gives us no advantages today.

IPT are looking at another possible (very expensive) tool Wait and see...

SRT: Do we wait?

The SPIDER SRT work was driven by ATLAS

CMS have started developing their own system (SCRAM)

We could now do nothing

I think we should go ahead as planned without being held back by the others - why?

It seems unlikely that we will get an official HEP wide SRT.

There are criticisms of the existing SRT

If we go ahead

Create requirements document - quickly We have benefited from the input from the other experiments as we started with a view too biased by the current SRT implementation Get it reviewed

must include on line people must include existing SRT users and others

If we go ahead (2)

Compare it to existing solutions

SRT in its various guises CMT SCRAM and free non-HEP solutions.

If it looks like we need a different tool need careful evaluation which includes an estimate of the costs.

Next step depends upon which appears to be the best product and readiness of the author to work with us.

So,