’

&

            $

            %

e+e−_{pair mass spectrum}

• particle ratios taken from a thermal model fitted

to measured ratios in Pb-Pb (T = 175MeV, μ_B = 270MeV )

• rapidity and pt distributions following measured systematics in Pb-Pb

• enhancement (0.25¡mee¡0.7 GeV/c2) : 2.6 ± 0.5(stat.) ± 0.6(syst.) (96’ data set) 3.9 ± 0.9(stat.) ± 0.9(syst.) (95’ data set)