Testbeam Aug. 96

RD42 Collaboration

dme
DRAFT,
August
22,
1996

Abstract

RD42 Testbeam Aug. 96 2 August 22, 1996

Figure 1:

1 Setup

RD42 Testbeam Aug. 96 3 August 22, 1996

2 Run Sheet

RD42 Testbeam Aug. 96 4 August 22, 1996

3 Calibration

RD42 Testbeam Aug. 96 5 August 22, 1996

tape runs events S5 S6 S7 S8 type slot type slot type slot type slot 960807-1 972 94k DD* 6 B* 1 Si-A 3 Si-B 4 960808-1 973 - DD* 6 B* 1 Si-A 3 Si-B 4 974 100k DD* 6 B* 1 Si-A 3 Si-B 4 960808-2 975 99k DD* 6 B* 1 Si-A 3 Si-B 4 960808-3 1028 140k DD* 6 B* 1 X 2 - 960809-1 1029 118k DD* 6 B* 1 X 2 - 960809-2 1066 115k Si-SCT 4 B* 1 X* 2 - (muons) (W54.BDM) 960810-1 1067 94k Si-SCT 4 B* 1 X* 2 - (W54.BDM) 960810-2 1072 140k Si-SCT 4 B* 1 X* 2 - (W54.BDM) 960810-3 1073 32k Si-SCT 4 B* 1 X* 2 - (W54.BDM) 960810-3 1074 ? Si-SCT 4 B* 1 X* 2 - (storm) (W54.BDM) 960811-1 1075 94k Si-SCT 4 B* 1 X* 2 - (W54.BDM) 960811-2 1079 96k Si-SCT 4 B* 1 X* 2 - (W55.BDM) 960811-3 1080 46k Si-SCT 4 B* 1 X* 2 - (W53.BDM) 960811-3 1081 48k Si-SCT 4 B* 1 X* 2 - (W56.BDM) 960811-4 1106 62k F*-SCT 1 - - - (W54.BDM) 960812-1 1107 ?7k F*-SCT 1 - - - (W55.BDM) 960812-2 1109 96k F*-SCT 1 - - - (W54.BDM) 960812-3 1118 107k DD 6 B** 2 X** 3 - 960812-4 1125 140k DD 6 B** 2 X** 3 DB26 4 from now two strips of F bonded to one SCT channel 960812-5 1133 112k F*-SCT 1 B** 2 X** 3 - (W54.BDM) 960813-1 1134 96k F*-SCT 1 B** 2 X** 3 - (W55.BDM) 960813-2 1136 96k F*-SCT 1 B** 2 X** 3 DB26* 4 (W54.BDM) 960813-3 1138 140k F*-SCT 1 B** 2 X** 3 DB26* 4 (W55.BDM) 960813-4 1139 103k F*-SCT 1 B** 2 X** 3 DB26* 4 (W54.BDM) 960813-5 1140 140k F*-SCT 1 B** 2 X** 3 DB26* 4 (W55.BDM)

Table 1: Run sheet