Running of ffem

ffl At 130Ű189 GeV, s-channel γ ’ 2Ű4 times Z for μ^+μ^�

and τ^+τ� with s0 ’ s

ffl Use 130Ű189 GeV cross-section and asymmetry

measurements to measure αem

ffl Form χ^2 between measurements and theory (ZFITTER)

varying αem

November 1998