50

100

150

0 50 100

Excluded

m^h (GeV) m^A (GeV)

OPAL 189 GeV scan (A tanβ>1 )

expected limit (a)

140

inaccessible Theoretically

preliminary

(c) OPAL 189 GeV scan (A)

Excluded

theoretically inaccessible for maximal mixing

1

10

0 50 100

tan β m^h (GeV) 140

40

0.7

preliminary expected limit for no mixing