0.229

0.23

0.231

0.232

0.233

0.234

0.235

83 83.5 84 84.5 85

LEP/SLD/CDF/D0 July 1995

PRELIMINARY

α(m_z^2)=1/128.89Α0.09

m_t=180 Α 12 GeV

Γ_{lepton} (MeV) sin^2θ_{eff}^{lept}

STANDARD MODEL

m_t 120

220

m_H

1000

300

60

68Ψ C.L. 99Ψ C.L.