0.21

0.22

0.23

0.23 0.24

sin^2θ_{eff}^{lept}

R_b

α(m_z^2)=1/128.89Α0.09 α_s=0.123Α0.006

m_t=180 Α 12 GeV

R_c=0.172

LEP/SLD/CDF/D0 July 1995

PRELIMINARY

SM

m_t

90 GeV 150 GeV 200 GeV

250 GeV

m_H (GeV)

60, 300, 1000

1 σ constraint from R_l and α_s R_b sin^2θ_{eff}^{lept}