0.2305

0.2310

0.2315

0.2320

0.2325

0.2330

83.4 83.6 83.8 84.0 84.2 84.4

PRELIMINARY

α(m_z)=1/128.89 α(m^2)=1/128.89

SM m_t=175.6 Α 5.5 60Λm_HΛ1000

Δα

Γ_{lepton}ΜMeVΝ sin^2θ^{lept} sin^2θ_{eff}

m_t m_H

68Ψ C.L. 95Ψ C.L.