m_WΜGeVΝ

W^+W^− cross section ΜpbΝ

LEP Average σ_{WW} = 3.69 Α 0.45 pb m_W = 80.40 ^{+0.22} GeV m_W = 80.40 _{−0.21} GeV

Ρs = 161.33 Α 0.05 GeV

0 1 2 3 4 5 6 7

79 79.5 80 80.5 81 81.5 82