-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4

-0.4 -0.2 0 0.2 0.4

Δg_1^z

Δκ_γ

95Ψ c.l.

68Ψ c.l.

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4

-0.4 -0.2 0 0.2 0.4

Δg_1^z λ_γ

95Ψ c.l.

68Ψ c.l.

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4

-0.4 -0.2 0 0.2 0.4 λ_γ

Δκ_γ

95Ψ c.l.

68Ψ c.l.