0

0.5

1

1.5

170 180 190 200

E_{cm} ΜGeVΝ σ^{ZZ}_{NC02} ΜpbΝ

LEP Preliminary

08/07/2001

Α2.0Ψ uncertainty

ZZTO

YFSZZ