1.5 2.0 2.5 Γ_WΜGeVΝ

LEP working group

χ^2/dof = 19.7 / 24

ALEPH Μ1998-2000Ν 2.13Α0.14

DELPHI Μ1997-2000Ν 2.11Α0.12

L3 Μ1996-2000Ν 2.24Α0.19

OPAL Μ1996-1998Ν 2.04Α0.18

LEP 2.150Α0.091

Summer 2001 - LEP Preliminary