0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

80 80.180.280.3 80.480.580.6 80.780.880.9 81

80.0 81.0 m_WΜGeVΝ

LEP working group

χ^2/dof = 32.5 / 39

ALEPH Μ1996-2000Ν 80.471Α0.049

DELPHI Μ1996-2000Ν 80.401Α0.066

L3 Μ1996-2000Ν 80.398Α0.069

OPAL Μ1996-1999Ν 80.490Α0.065

LEP 80.450Α0.039

Summer 2001 - LEP Preliminary