00.1

0.20.3

0.40.5

0.60.7

0.80.9 1

8080.180.280.380.480.580.680.780.880.981

80.0 81.0 m_WΜGeVΝ (4q)

LEP working group

correl. with non-4q = 0.28

ALEPH Μ1996-2000Ν 80.507Α0.070

DELPHI Μ1996-2000Ν 80.384Α0.084

L3 Μ1996-2000Ν 80.478Α0.093

OPAL Μ1996-1999Ν 80.408Α0.120

LEP 80.457Α0.062

Summer 2001 - LEP Preliminary