80.2

80.3

80.4

80.5

80.6

130 150 170 190 210 m_H ΜGeVΝ 114 300 1000

m_t ΜGeVΝ m_W ΜGeVΝ

Preliminary

68Ψ CL

Δα

LEP1, SLD, νN, APV Data LEP2, pp^− Data