80.0 81.0 M_WΜGeVΝ

χ^2/dof = 32.5 / 39

ALEPH Μ1996-2000Ν 80.458Α0.055

DELPHI Μ1996-2000Ν 80.404Α0.074

L3 Μ1996-2000Ν 80.376Α0.077

OPAL Μ1996-1999Ν 80.490Α0.065

LEP 80.447Α0.042

Summer 2002 - LEP Preliminary