Preliminary LEP Averaged d σ / d cosΘ (e^+e^-)

cosΘ_e

Ratio Data / SM

207 GeV

M_H=1.0 TeV, λ=+1

M_H=1.0 TeV, λ=-1 0.9

0.95

1

1.05

1.1

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8