80.0 81.0 M_WΜGeVΝ (non-4q)

LEP working group

correl. with 4q = 0.18

ALEPH Μ1996-2000Ν 80.375Α0.062

DELPHI Μ1996-2000Ν 80.414 Α0.089

L3 Μ1996-2000Ν 80.314Α0.087

OPAL Μ1996-1999Ν 80.516Α0.073

LEP 80.411Α0.044

Winter 2003 - LEP Preliminary