0 0.5 1 1.5 2 2.5 3 3.5

0 50 100 150 200 250 300 350 400 M_{e*}^{-4} ΜTeV^{-4}Ν

ΔLogL

M_{e*} > 248 GeV f = f´ = 1 e^+e^− → γγ(γ) preliminary LEP