-0.2

0

0.2

0.4

0.6

0.8

1

1.2

1.4

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Q ΜGeVΝ δ_I(Α,Α)

a) Data BEA

BEI

Data fit

BEA fit