0 1 2 3 4 5 6

100 30 300 m_H ΜGeVΝ

Δχ^2

Excluded

Δα_{had} =

Δα^{(5)} 0.02758Α0.00035 0.02749Α0.00012 incl. low Q^2 data

Theory uncertainty